/*
 Navicat Premium Data Transfer

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 50725
 Source Host           : 127.0.0.1:3306
 Source Schema         : db_information_table

 Target Server Type    : MySQL
 Target Server Version : 50725
 File Encoding         : 65001

 Date: 06/06/2019 10:59:19
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tb_info_list
-- ----------------------------
DROP TABLE IF EXISTS `tb_info_list`;
CREATE TABLE `tb_info_list` (
  `id` bigint(20) NOT NULL,
  `type` varchar(64) COLLATE utf8mb4_bin NOT NULL,
  `name` varchar(64) COLLATE utf8mb4_bin NOT NULL,
  `phone` varchar(11) COLLATE utf8mb4_bin NOT NULL,
  `email` varchar(64) COLLATE utf8mb4_bin DEFAULT NULL,
  `remark` varchar(1024) COLLATE utf8mb4_bin DEFAULT NULL,
  `created` bigint(20) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;

SET FOREIGN_KEY_CHECKS = 1;
